Contents
Wintek

Help System	Version

Please, choose a topic:

•	Counting and contouring

•	File formats

•	Create a symbol

This a beta version that will expire in June 1996!

We shall not be held liable for program errors!

Usage of this software is on your own risk!

Autoren: 	Dr. Andreas Peterek, Dr. Stefan Krumm

how to contact us...


Version
Version 1.0 Beta1

March 96


Dateiformate
File & data formats

WinTek uses ASCII file format for data exchange. For data editing a simple editor like "notepad" or the build in editor in WinTek can be used. The file extension should be ".dat". WinTek automatically detects what sort of data it is about to read in by analyzing the file structure. If WinTek is in doubt about the format, it asks the user for confirmation. A sample file can be found at the end of this text.

Data must be in one of these formats:

planar and linear data

Hoeppener data

azimuth data

azimuth data with weighting

U-stage (not yet implemented)

Sample file:

262,32,242,30

234,30,-231,30

283,30,236,22

250,38,-231,36

100,38,27,14

90,32,59,28

*

Daten Sau-Alm (Kärnten)

Inhalt


Bruchdaten
Hoeppener data

120,45,120,45	Azi Fl, Fa Fl, Azi Li, Fa Li

30,45,-120,5	Azi = azimuth or dip direction

.	Fa = dip

.	Fl = fault plane

.	Li = linear

.

.	reverse fault: negative   Azi Li!

.

*	end of file

Daten Thassos	from here onwards: abitrary text


Azimut Daten
Azimuth Data

120	Azimuth

60	"

.

.

.

.

*	end of file

Daten Thassos	from here onwards: abitrary text


Azimut Daten mit Gewichtung
Azimuth Data, weighted

120,35	Azimut, weighting

60,5	"

.

.

.

*	end of file

Daten Thassos	from here onwards: abitrary text


U-Tisch
U-Stage data

120,45,ml	Azimuth, Wright-angle, axis

30,45,kl	"

.	axes allowed:

.	ml, mr, kl, kr

.

.

*	end of file

Daten Thassos	from here onwards: abitrary text


Flaechen- oder Lineardaten
Planar and linear data

120,45	Azimuth (dip direction), dip

30,45	"

.	"

.	etc.

.

*	end of file

Daten Thassos	from here onwards: abitrary text


Symbol entwerfen
Edit a symbol

WinTek allows user-defined symbols. The symbol definition is written to an ASCII file with the extension .sym. The *.sym file should be stored to a directory called ...\wintek\symbol\.

The *.sym file contains the number of polygon segments, the number of points of the individual polygons as well as the coordinates of the polygon segments. The coordinates are polar coordinates. Numerical values must be integers.

Coordinate example:

45,3	45 = angle, counted clockwise

3  = distance from center

The symbol size is determined by the distance from the center or by a adjustable variable ("symbol size") within WinTek itself..

A valid  entry  must be of the following format (only the fist column):

2	number of polygons

4	number of points in first polygon

45,3	1. polygon point

135,3	2. polygon point

225,3	...

315,3	...

4	number of points in second polygon

45,2	1. polygon point

135,2	2. polygon point

225,2	....

315,2    	....

This example  (file: doppel.sym) draws a symbol consisting of two polygons (a double square).

Another example:

1

8

10,5

30,3

35,4

160,5

200,5

325,4

330,3

350,5

This  (file: fanta.sym) draws a polygon with eight corners that looks a bit like the bottle of a soft drink (Fanta-bottle).

Contents


Auszaehlen und Isolinien zeichnen
Counting and contouring

WinTek  can count axial datasets and display the results as contour diagram. Theoretical background and references can be found at the bottom of this paragraph.

The dialog box "Contours..." allows the user to adjust the contour diagram to his needs.

If a value is modified by one of the dialog buttons, related input values will be updated automatically.

The term "number of points" refers to the number of point within one counting class.

Number of contours:

this defines the number of isolines used in the diagram. The input value is limited by 1 and by the maximum of data points in a single counting intervall.

Contour intervall:

defines the distance between subsequent contours

left column:

interval size expressed as number of datapoints

right column:

interval size expressed as percentage of the total number of values.

Contents


Zu erreichen unter
Dr. Andreas Peterek

Dr. Stefan Krumm

Institut für Geologie

Schlossgarten 5

D 91054 Erlangen

Tel:	++49 9131 852615

Fax:	++49 9131 859295

e-mail:	krumm@geol.uni-erlangen.de

apeterek@geol.uni-erlangen.de

http://www.uni-erlangen.de/docs/FAU/fakultaet/natIII/geo_min/

Contents