
AC:
F1=Data file entered to start a new plot.
F3=Plot parameter/setup file to save the current plot setup.
F4=Auxiliary layout file to overlay and save the layout if resorted.
GT=Graph title (any alphanumeric information, maximum 75 characters).
L1=X-axis label (maximum 75 characters).
L2=Y-axis label (maximum 75 characters).
GO=Graph origin(x,y) in inches from the lower-left corner of screen.
SF=Overall graph scale factors (x,y) for screen plotting only.
VT=ANSI graph flag on VT100 type text terminal (character level resolution).
SE=Screen erase flag (if YES, screen is erased before plotting).
C1=Axis color number/pen code.
BC=Group Bar Configuration (SIDE: plot them side by side; STACK: stack them up.
BP=Position code to draw bar group labels (other valid keywords: TOP and SKIP).
BS=Bar spacing in inches between bar groups.
BO=Offset in inches from origin to draw the first bar.
LB=Data set ID drawing flag (LB=0: skip; LB=1: draw; LB=2: box them as well).
LP=Data set ID position (x,y) of the lower-left corner of label box.
T2=Y-axis setup (axis-type,divisions,sub-divisions,scale-digits,axis-pattern).
X2=Axis setup (x-axis-length, y-axis-length, 1st-major-tickmark-offset).
S2=Y-axis setup (axis scale units on major tickmarks).
PN=Pen code for drawing the set of bars (PN=0: skip drawing the set of bars).
PT=Bar hatching pattern number for drawing the set of bars (0=no hatching).
LI=Line type code for drawing the set of bars.
BL=Bold-line or linewidth code in number of the default linewidth.
SQ=Actual plotting sequence of the set of bars in the group.
WD=Bar width in inches for the set of bars.
XO=X-offset in inches from the default position for drawing the set of bars.
YO=Y-offset in inches from the default position for drawing the set of bars.
YS=Re-scale factor for all bar heights in the set of bars.
ID=Data set identification label for the set of bars being displayed.
NO=Active data set number.
PT=Number o bars in the set of bars being displayed.
YL=Minimum bar height in the set of bars being displayed.
YH=Maximum bar height in the set of bars being displayed.
