\magnification=1095
\input psformat
\line{\rm\hfil\today}
\null\vfil
\centerline{\BIG P O W D E R}\bigskip
\centerline{\BIG S U I T E}
\vfil
{\obeylines
Software authors:
\leftskip 1in
		B. H. Toby, Air Products and Chemicals, Inc.
		R. L. Harlow, Du Pont Experimental Station
		M. A. Holomany, JCPDS -- International Centre for Diffraction Data
		based in part on work by M. F. Garbauskas and R. Goehner, GE
\par}
\bigskip\bigskip
{\obeylines
Documentation author:
\leftskip 1in
		B. H. Toby
\smallskip
		Air Products and Chemicals, Inc.
		7201 Hamilton Blvd.
		Allentown, PA 18195
\smallskip
		INTERnet: tobybh@ttown.apci.com
\par}
\vfil
\noindent
\copyright\ 1988-1992 Brian H. Toby, E. I. du Pont de Nemours 
and Co., Air Products and Chemicals, Inc.
\smallskip
\par\noindent
Permission is granted for unlimited use, distribution
and modification of this manual and associated software,
provided that modified software and
software based on this code must also be made freely available.
\eject

\pageno=1

\input overview
\input filefmt
\vfill\eject
\input [.logic]logic
\input [.logic]examples
\vfill\eject
\input [.search]search
\vfill\eject
\input [.cmpr]cmpr
\vfill\eject
%\input [.manip]manip
%\vfill\eject
\input customize
\vfill\eject
\input 1readme
\vfill\eject
\input [.encode]encode
\vfill\eject
\bye
